{"id": 1798, "url": "/mdms-v2/v2/_update/HCM.ParsingTemplate", "name": "MDMS", "path": "", "enabled": true, "leftIcon": "dynamic:ContractIcon", "tenantId": "mz", "createdBy": null, "rightIcon": "", "createdDate": null, "displayName": "HCM Parsing Template Updation", "orderNumber": 1, "queryParams": "", "serviceCode": "MDMS", "parentModule": "", "navigationURL": "", "lastModifiedBy": null, "lastModifiedDate": null}