{"id": 1857, "url": "/mdms-v2/v2/_update/Workbench.UISchema", "name": "", "path": "", "enabled": false, "leftIcon": "", "tenantId": "mz", "createdBy": null, "rightIcon": "", "createdDate": null, "displayName": "", "orderNumber": 0, "queryParams": "", "serviceCode": "", "parentModule": "", "navigationURL": "", "lastModifiedBy": null, "lastModifiedDate": null}